SIEMENS COMMON RAIL INJECTOR. CITROEN / FORD / PEUGEOT. 5WS40007

SIEMENS COMMON RAIL INJECTOR – NEW

GOOD QUALITY PRODUCT – GENUINE SIEMENS

PART NO:

5WS40148-Z

ALTERNATE PART NO:

5WS40007 5WS40148

OEM PART NO:

00001980E7 2S6Q9F593AA
9655304780 2S6Q9F593AB
9655304880 2S6Q9F593AC
2S6Q9F593BB

VEHICLE  MAKE:

CITROEN C3
APPLICATION : PLURIEL HB
ENGINE CODES: 8HX (DV4TD)
ENGINE SIZE : 1.4
YEAR : 2003 ONWARDS

FORD FUSION
APPLICATION : JU
ENGINE CODES: F6JA
ENGINE SIZE : 1.4
YEAR : 2002 - 2012

PEUGEOT
APPLICATIONS: 1007 KM
ENGINE CODES: 8HX (DV4TD)
ENGINE SIZE : 1.4
YEAR : 2005 ONWARDS

IF YOU HAVE ANY QUESTIONS OR IF YOU ARE UNSURE IF THIS IS THE CORRECT PART NUMBER, PLEASE CONTACT US ON THE MESSAGE BUTTON OR CALL US ON:

(08) 9308 3555 / 0416 131 151, IF CALLING OUTSIDE OF AUSTRALIA +618 9308 3555 / +61 416 131 151