BOSCH COMMON RAIL INJECTOR. MERCEDES BENZ. 6110700587

BOSCH COMMON RAIL INJECTOR – NEW

GOOD QUALITY PRODUCT – GENUINE BOSCH

PART NO:

0445110011

ALTERNATE PART NO:

0445110012 0986435004

OEM PART NO:

0445110009 61107004870080 A6110700587
0445110010 6110700587 A611070058738
611070058738 A61107005870080

VEHICLE :

MERCEDES BENZ C CLASS
APPLICATIONS: 202
CYLINDERS: 4
ENGINE CODES: OM 611.960
ENGINE SIZE: 2.2 CDi
YEAR: 1997 - 2001

MERCEDES BENZ E CLASS
APPLICATIONS: 210 / 200 / 220
CYLINDERS: 4
ENGINE CODES: OM 611.961
ENGINE SIZE: 2.1 / 2.2 CDi
YEAR: 1998 - 2002

MERCEDES BENZ V CLASS
APPLICATIONS: 638
CYLINDERS: 4
ENGINE CODES: OM 611.980
ENGINE SIZE: 2.2 CDi
YEAR: 1999- 2003

MERCEDES BENZ VITO
APPLICATIONS: 638
CYLINDERS: 4
ENGINE CODES: OM 611.980
ENGINE SIZE: 2.2 CDi
YEAR: 1999- 2003

IF YOU HAVE ANY QUESTIONS OR IF YOU ARE UNSURE IF THIS IS THE CORRECT PART NUMBER, PLEASE CONTACT US ON THE MESSAGE BUTTON OR CALL US ON:

(08) 9308 3555 / 0416 131 151, IF CALLING OUTSIDE OF AUSTRALIA +618 9308 3555 / +61 416 131 151